NetInfo Editions Products Summar y

Revised: A ugust 1, 1995

NETINFO EDITIONS

GENERAL REQ UIREMENTS

The premier object-or iented netw ork and system administr ation solution f or enter prise-wide computing. NetInfo Editions simplify the management of administr ative information in a heterogeneous netw ork of NEXTSTEP/OpenStep and UNIX machines .

SOFTWARE COMP ATIBILITY NetInfo bundled with NEXTSTEP and NetInf o Editions are 100% compatib le and pro vide complete integ ration between NEXTSTEP and other UNIX oper ating systems . NetInfo Editions are tightly integ rated with the system administr ation tools of the host.

INSTALLATION Installation requires an ISO-9660 f ormat CD-R OM drive on ser ver’s netw ork.

NeXTans wer s� : This guide and man y other kinds of inf ormation are a vailable from NeXTans wers , NeXT’s free information-retr ieval system. F or NeXTans wers documents b y fax, call (415) 780-3990 from a touch-tone phone . For NeXTans wers b y Internet mail, send e-mail to ne xtans wers@ne xt.com with the tw o-word subject: INDEX HELP.

'1995 NeXT Computer , Inc. All rights reser ved. NeXT, the NeXT logo , NEXTSTEP, PDO, Portable Distributed Objects , and NeXT ans wers are trademar ks of NeXT Computer , Inc. UNIX is a registered tr ademar k in the United States and other countr ies, licensed e xclusively through X/Open Compan y Limited. All other tr ademar ks mentioned belong to their respectiv e owners . NeXT will from time to time re vise the speci�cations descr ibed herein, and reser ves the r ight to mak e such changes without ob ligation to notify the purchaser .

NetInfo Editions Products Summary Revised: August 8, 1995

Software Compatibility Guide

HEWLETT-PACKARD SUN MICROSYSTEMS DIGITAL EQUIPMENT

SERVER OPERA TING SYSTEM

HP-UX 9.0 SunOS 4.1.3 Solar is 2.4 DEC Unix (OSF/1 V3.0)

DEPARTMENT OR BRANCH SERVERS

HP 9000 Ser ies 700 W orkstations Model 712, 715, 725, 735 or 755; HP 9000 Ser ies 800 Ser vers Models E, F , G, or H

SPARCstation IPX SPARCclassic Ser ver SPARCser ver LX, 5, 10, and 20 SPARCser ver 1000^�

DEC 2000, 3000, and 4000 AXP DEC 2100 Ser ver Model A500MP

NetInfo 3.3 N5756 N5754 N5760 N5758

CORPORA TE SER VERS HP 9000 Ser ies 800 Ser vers Model I or T; HP 9000 Cor porate Business Ser vers

SPARCcenter 2000^� DEC 7000 AXP DEC 10000 AXP

NetInfo 3.3 N5757 N5755 N5761 N5759

AVAILABILITY NetInfo 3.3 Now Now Now Now

NOTES A �oating point unit (FPU) is not needed b ut is recommended f or the ser ver.

�SunOS is not a vailable for machines r unning in SMP mode .