main_index
SuperPCB Parts Guide

© 1992-1997 Mental Automation

This parts guide provides a brief description of the package parts in the SuperPCB library. Parts are listed in numerical order.

The L1 designator refers to parts included in the MA8505 (SPCB/I) and MA8510 (SPCB/R) libraries, while L2 refers to additional parts included with the MA8500 library.

Through-Hole Packages

Surface-Mount Packages

Definitions


Definitions

A/D---analog to digital converter

ALU---arithmetic-logic unit

BCD---binary-coded decimal

CMOS---Complementary metal-oxide semiconductor

CPU---central processing unit

DAC---digital to analog convertor

DIP---dual inline package

DMA---direct memory access

DPDT---double-pole, double throw (switches, relays)

DPST---double-pole, single throw (switches, relays)

DRAM---Dynamic random access memory (needs refresh signals/controller)

DSP---digital signal processor

ECL---emitter-coupled logic (fast & high power)

EEPROM---Electrically eraseable programmable memory

EPLD---eraseable-programmable logic device

EPROM---(UV) Eraseable-programmable read-only memory

FIFO---first-in, first-out (memory)

JFET---junction field-effect transistor

LCD---liquid-crystal display

LED---light-emitting diode

MCU---microcomputing unit

ms---millisecond

MUX---multiplexer

NMOS---N-type metal-oxide semiconductor

ns---nanosecond

OP AMP---operational amplifier

PAL---programmable array logic

PGA---pin grid array

PLD---programmable logic device

PROM---Programmable read-only memory

RAM---Random access memory

ROM---Read-only memory

SCR---Silicon controlled rectifier

SIMM--Single-in-line memory module

SIP---single inline package

SPST---single-pole, single throw (switches, relays)

SRAM---Static random access memory

TTL---Transistor-transistor logic (74xxx series and others)

UART---Universal asynchronous receiver-transmitter (serial interface)

UL---Underwriters Lab

uP---microprocessor

usec---microsecond


THRU
Through-Hole Packages

Capacitors

Connectors

Crystals & Oscillators

Diodes

ICs

Inductors

Miscellaneous

Potentiometers

Relays

Resistors

Switches

Transistors

Alphabetical Listing


Capacitors (Through-Hole)

C1E4P        L1    Panasonic V-series .01mf capacitor (.2" spacing)

C1E5P        L1    Panasonic V-series .1mf capacitor

C1E7M        L2    Capacitor with 0.35" spacing

C1M          L1    Panasonic V-series 1.0mf capacitor

C47E4P       L1    Panasonic V-series .47mf capacitor

CAP1         L2    Upright Capacitor, 100 mil spacing

CAP2         L2    Upright Capacitor, 200 mil spacing

CAP3         L2    Upright Capacitor, 300 mil spacing

CAXL0P3      L1    Axial capacitor with .3" spacing

CAXL0P4      L1    Axial capacitor with .4" spacing

CAXL0P5      L1    Axial capacitor with .5" spacing

CAXL0P6      L1    Axial capacitor with .6" spacing

CAXL0P7      L1    Axial capacitor with .7" spacing

CAXL0P8      L1    Axial capacitor with .8" spacing

CAXL0P9      L1    Axial capacitor with .9" spacing

CAXL1P0      L1    Axial capacitor with 1.0" spacing

ECAP0P1      L1    Electrolytic capacitor with .1" centers

ECAP0P2      L1    Electrolytic capacitor with .2" centers

ECAP0P3      L1    Electrolytic capacitor with .3" centers

VARCAP1      L2    Sprague Goodman 10mm side adjust FILMTRIM(R) variable cap

VARCAP2      L2    Sprague Goodman 10mm top & bottom adjust FILMTRIM(R) variable cap

VARCAP3      L2    Sprague Goodman 8mm side adjust FILMTRIM(R) variable cap, p199 Digikey

VARCAP4      L2    Sprague Goodman 8mm top & bottom adjust FILMTRIM(R) variable cap


Connectors (Through-Hole)

156SIP10     L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1101)

156SIP11     L2    Molex/Waldom .045" SIP, .156 centers header (28-48-1111)

156SIP12     L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1121)

156SIP2      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1021)

156SIP3      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1031)

156SIP4      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1041)

156SIP5      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1051)

156SIP6      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1061)

156SIP7      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1071)

156SIP8      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1081)

156SIP9      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1091)

CONN96       L2    3 x 32 connector

DB15         L1    15 pin right angle D connector Burndy catalog p.4-8 1990

DB25         L1    Burndy 25-pin right-angle D connector p4-8 1990 catalog

DB37         L1    Burndy 37-pin right-angle D connector p4-8 1990 catalog

DB9          L1    9 pin right angle connector Burndy catalog p4-8 1990

EACONN12     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN20     L1    EDAC series 337 connectors EDAC series 337 connectors

EACONN24     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN30     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN36     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN44     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN50     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN56     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN60     L2    EDAC series 337 connectors EDAC series 337 connectors

ECONN20      L1    TI H4 series connector .1" centers

ECONN26      L2    TI H4 series connector .1" centers

ECONN30      L2    TI H4 series connector .1" centers

ECONN34      L2    TI H4 series connector .1" centers

ECONN36      L2    TI H4 series connector .1" centers

ECONN44      L2    TI H4 series connector (.1" centers)

ECONN50      L2    TI H4 series connector (.1" centers)

ECONN56      L2    TI H4 series connector (.1" centers)

ECONN60      L2    TI H4 series connector (.1" centers)

FCONN40      L2    TI H4 series connector .125" centers

FCONN62      L2    TI H4 series connector .125" centers

FCONN70      L2    TI H4 series connector .125" centers

H1020        L2    Hirose rt angle DIN connector Digikey H1020

H1032        L2    Hirose rt angle DIN connector Digikey H1032

H1044        L2    Hirose rt angle DIN connector Digikey H1044

H1050        L2    Hirose rt angle DIN connector Digikey H1050

H1064        L2    Hirose rt angle DIN connector (plug) Digikey H1064

H1090        L2    Hirose rt angle DIN connector (plug) Digikey H1090

H1100        L2    Hirose rt angle DIN connector (plug) Digikey H1100

HDR10        L2    Header with .025 posts (Sullins/3M)

HDR12        L2    12-pin DIP header (Sullins/3M)

HDR14        L2    14-pin DIP header (Sullins/3M)

HDR16        L2    16-pin DIP header (Sullins/3M)

HDR18        L2    18-pin DIP header (Sullins/3M)

HDR2         L2    2-pin DIP header (Sullins/3M)

HDR20        L2    20-pin DIP header (Sullins/3M)

HDR22        L1    22-pin header

HDR24        L2    24-pin DIP header (Sullins/3M)

HDR26        L2    26-pin DIP header (Sullins/3M)

HDR28        L2    28-pin DIP header (Sullins/3M)

HDR30        L2    30-pin DIP header (Sullins/3M)

HDR32        L2    32-pin DIP header (Sullins/3M)

HDR34        L2    34-pin DIP header (Sullins/3M)

HDR36        L2    36-pin DIP header (Sullins/3M)

HDR38        L2    38-pin DIP header (Sullins/3M)

HDR4         L2    4-pin DIP header (Sullins/3M)

HDR40        L2    40-pin DIP header (Sullins/3M)

HDR50        L2    50-pin DIP header (Sullins/3M)

HDR6         L2    6-pin DIP header (Sullins/3M)

HDR8         L2    8-pin DIP header (Sullins/3M)

IBM_AT       L2    2 x 18 aux edge card connector for IBM PC AT

IBM_XT       L1    2 x 31 edge card connector for IBM PC XT/AT

J4           L2    15-pin rt angle connector

JACK1        L1    Switchcraft phono jack (3515PC), p2-26 1991 catalog

JSIP16       L2    16-pin strip connector

JSIP20       L2    20-pin strip connector

JSIP26       L2    26-pin strip connector

PJACK        L2    rt angle jack Switchcraft MDPC2ARA

PJACK3       L2    Switchcraft rt angle 3-conductor jack, SN37 series

RCONN20      L1    5342 Molex connector p 21F 1982 Molex catalog

RCONN26      L2    5342 Molex connector p 21F 1982 Molex catalog

RCONN34      L2    5342 Molex connector p 21F 1982 Molex catalog

RCONN40      L2    5342 Molex connector p 21F 1982 Molex catalog

RCONN50      L2    5342 Molex connector p 21F 1982 Molex catalog

RCONN60      L2    5342 Molex connector p 21F 1982 Molex catalog

WRSIP10      L2    Molex/Waldem PCB connector side entry (22-15-2106)

WRSIP11      L2    Molex/Waldem PCB connector side entry (22-15-2116)

WRSIP12      L2    Molex/Waldem PCB connector side entry (22-15-2126)

WRSIP2       L2    Molex/Waldem PCB connector side entry (22-15-2026)

WRSIP3       L2    Molex/Waldem PCB connector side entry (22-15-2036)

WRSIP4       L2    Molex/Waldem PCB connector side entry (22-15-2046)

WRSIP5       L2    Molex/Waldem PCB connector side entry (22-15-2056)

WRSIP6       L2    Molex/Waldem PCB connector side entry (22-15-2066)

WRSIP7       L2    Molex/Waldem PCB connector side entry (22-15-2076)

WRSIP8       L2    Molex/Waldem PCB connector side entry (22-15-2086)

WRSIP9       L2    Molex/Waldem PCB connector side entry (22-15-2096)

WSIP10       L1    Molex/Waldom .25" SIP header (22-03-2101)

WSIP11       L1    Molex/Waldom .25" SIP header (22-03-2111)

WSIP12       L1    Molex/Waldom .25" SIP header (22-03-2121)

WSIP2        L1    Molex/Waldom .25" SIP header (22-03-2021)

WSIP3        L1    Molex/Waldom .25" SIP header (22-03-2031)

WSIP4        L1    Molex/Waldom .25" SIP header (22-03-2041)

WSIP5        L1    Molex/Waldom .25" SIP header (22-03-2051)

WSIP6        L1    Molex/Waldom .25" SIP header (22-03-2061)

WSIP7        L1    Molex/Waldom .25" SIP header (22-03-2071)

WSIP8        L1    Molex/Waldom .25" SIP header (22-03-2081)

WSIP9        L1    Molex/Waldom .25" SIP header (22-03-2091)

WTSIP10      L2    Molex/Waldem PCB connector top entry (22-02-2105)

WTSIP11      L2    Molex/Waldem PCB connector top entry (22-02-2115)

WTSIP12      L2    Molex/Waldem PCB connector top entry (22-02-2125)

WTSIP2       L2    Molex/Waldem PCB connector top entry (22-02-2025)

WTSIP3       L2    Molex/Waldem PCB connector top entry (22-02-2035)

WTSIP4       L2    Molex/Waldem PCB connector top entry (22-02-2045)

WTSIP5       L2    Molex/Waldem PCB connector top entry (22-02-2055)

WTSIP6       L2    Molex/Waldem PCB connector top entry (22-02-2065)

WTSIP7       L2    Molex/Waldem PCB connector top entry (22-02-2075)

WTSIP8       L2    Molex/Waldem PCB connector top entry (22-02-2085)

WTSIP9       L2    Molex/Waldem PCB connector top entry (22-02-2095)


Crystals & Oscillators (Through-Hole)

OSCECS       L2    14-pin oscilltor package p77 Digikey Mar.1991

OSC14E       L2    Epson 14-pin osc. package (SG-51x) Digi-Key p. 79 Mar. 1991

OSC8ECS      L2    8-pin oscilltor package p77 Digikey Mar.1991

OSC8E        L2    Epson 8-pin osc. package (SG-531x) Digi-Key p. 79 Mar. 1991

XTAL         L1    Crystal, 150 mil hole spacing


Diodes (Through-Hole)

BRIDGE1      L1    Diode Bridge

DIODE2       L2    Diode, 200mil spacing

DIODE2P5     L2    Diode, 250mil spacing

DIODE3       L2    Diode, 300mil spacing

DIODE4       L2    Diode, 400mil spacing

DIODE5       L2    Diode, 500mil spacing

DIODE6       L2    Diode, 600mil spacing

DIODE7       L2    Diode, 700mil spacing

DO7          L1    Diode, 200mil spacing


ICs (Through-Hole)

DIP10        L2    National Semiconductor Linear Manuaal 1982 p. 14-25, N10B package

DIP10M       L2    Package for MAN3480 7-segment display (General Instrument)

DIP12        L2    DIP12 package

DIP14        L1    DIP14 package, N014 TI TTL data book 1988, p3-15

DIP14J       L2    DIP14 package for connector/header

DIP14MC      L2    Metal Can Package from BURR-BROWN Volume 33 pg2-154

DIP14R       L2    DIP14 with R designator

DIP14S       L2    DIP14 with S designator

DIP14S       L2    package used for switch connection

DIP16        L1    DIP16 package, N016 TTL data book 1988, p3-16

DIP16-8      L2    Single Wide 16-Pin Dip from BURR-BROWN Volume 33 pg4-59

DIP16MC      L2    DIP16 Metal Dip from BURR-BROWN Volume 33 pg 2-139

DIP18        L2    DIP18 package

DIP18-6      L2    DIP18 package used for MAN6700 display

DIP18ISO     L2    DIP18ISO package,Linear Tech. 1994, pg 14-19

DIP18J       L2    DIP18 package for connector/header

DIP18MC      L2    Metal Hermetic DIP18 from BURR-BROWN Volume 33 pg3-37

DIP20        L1    TI DIP20 package N020 p 3-17 TTL data book 1988

DIP20-10     L2    20-Lead ISO Omni from BURR-BROWN IC Databook 95 pgD.5

DIP20CA      L2    16 Pin Dip20 T WIDE from BURR-BROWN Volume 33 pg4-97

DIP20CB      L2    19 Pin Dip20 T WIDE from BURR-BROWN Volume 33 pg4-111

DIP20MC      L2    20 Pin Dip Metal Can from BURR-BROWN Volume 33 pg4-97

DIP22        L2    400 mil DIP22 package J22A National Semi. CMOS data book 1984 p16-8

DIP22-3      L2    300 mil DIP22 package (IDT)

DIP24        L1    600 mil DIP24 package

DIP24-12     L2    DIP24-12 from BURR-BROWN Linear Databook 94 pgD.13

DIP24-16     L2    24-Pin Double-Wide Hermetic DIP from BURR-BROWN Volume 33 pg4-22

DIP24-3      L1    300 mil DIP24 package (IDT)

DIP24CA      L2    Dip24 with 15 pins from BURR-BROWN Volume 33 pg5-103

DIP24J       L2    DIP24 package for connector/header

DIP24MC      L2    Dip24 with 16 pins from BURR-BROWN Volume 33 pg5-103

DIP24N       L2    DIP24 Single Wide from BURR-BROWN IC Databook 95 pgD.15

DIP28        L1    DIP28 package N028 TI TTL data book, 1988 p3-18

DIP28-14     L2    DIP28-14 from BURR-BROWN IC Databook 95 pgD.18

DIP28-3      L2    300 mil DIP28 package (IDT)

DIP28-4      L2    400 mil DIP28 package (IDT)

DIP28N       L2    DIP28N from BURR-BROWN Linear Databook 94 pgD.14

DIP32        L2    NEC package, p12-29 Memory products 1991

DIP32-16     L2    32-Pin Triple Wide Dip from BURR-BROWN Volume 33 pg4-36

DIP32H       L2    package part for Analog Devices DAS1152 converter

DIP32MC      L2    DIP32 Metal Can from BURR-BROWN Volume 33 pg3-153

DIP4         L2    used for CTS 206-2 part & others (2 psn DIP switch)

DIP40        L1    600 mil DIP40 package N040 TI TTL databook 1988 p3-19

DIP40-16     L2    40-Pin Double Wide Hermetic Dip from BURR-BROWN Volume 33 pg4-22

DIP40MC      L2    Dip40 Metal Can from BURR-BROWN Volume 33 pg9.2-121

DIP42        L2    NEC DIP part, p7-8 microprocessor data book 1990

DIP46        L2    Dip-46 Metal Can from BURR-BROWN Volume 33 pg9.2-113

DIP46MC      L2    Dip-46 Metal Can from BURR-BROWN Volume 33 pg9.2-113

DIP48        L2    NEC DIP part, p7-11 microprocessor data book 1990

DIP48-4      L2    400 mil DIP48 part (IDT)

DIP4S        L2    DIP4 with S designator

DIP4S        L2    used for CTS 206-2 part & others (2 psn DIP switch)

DIP50-9      L2    Preci-DIP 50-pin socket

DIP6         L2    Used for CTS 206-3 part & others (3 psn DIP switch)

DIP6         L2    used for CTS 206-3 part & others (3 psn DIP switch)

DIP64        L2    600 mil DIP64 package

DIP64-9      L2    NEC DIP64 package page 4.3-6 idt 1992 High-performance logic

DIP68        L2    idt DIP68 package p. 4.3-5 1992 data book high performance logic

DIP8         L1    DIP8 package P008 TI TTL data book 1988 p 3-22

DIP8A        L1    DIP8 package with A designator

DIP8A        L2    DIP8 package P008 TI TTL data book 1988 p 3-22 ("A" type designator)

DIP8IC       L1    DIP8 package with IC designator

DIP8IC       L2    DIP8 package P008 TI TTL data book 1988 p 3-22 (IC designator)

DJ26         L2    Page 2-12 1989 TI MOS Memory

DMP14        L2    14-pin DIL plastic mini-mold from JRC C-MOS IC Databook pg 1-6

DMP16        L2    16-pin DIL plastic mini-mold from JRC C-MOS IC Databook pg 1-8

DMP20        L2    20-pin DIL plastic mini-mold from JRC C-MOS IC Databook,pg1-10

DMP24        L2    24-pin DIL plastic mini-mold from JRC C-MOS IC Databook pg 1-12

DMP30        L2    30-pin DIL plastic mini-mold from JRC C-MOS IC Databook pg1-14

DMP8         L2    8-pin DIL plastic minimold from JRC CMOS IC databook, pg 1-4

G12B         L2    12 Lead Metal Can Package from National Semiconductor, 1989 pg 8-32

G12B         L2    12-lead (.4 square) metal can, National Semiconductor 1989

H10C         L2    10-lead package (TO100) National Semi. 1989 General Purpose Linear

H10C         L2    H10C (T0100) package, National p. 8-36, 1989 GP Linear Devices

HO8C         L2    8-pin package (TO99) National Semiconductor 1989 General Purpose Linear

HO8C         L2    H08C package (TO99) National Semiconductor 1989 GP Linear Devices

PGA132       L2    Intel Packaging 1991/1992 page 2-33

PGA144       L2    PGA144 package

PGA168       L2    Intel Packaging 1991/1992 page 2-34

PGA180       L2    PGA180 package for TI TMS320C30 chip page A-26, C30 User's Guide, 1988

PGA68        L1    IDT PGA68 package p4-3 1992 logic data book

PGA68-X      L2    alternate PGA68 package

PGA84        L2    PGA84 package

PGA88        L2    Intel PGA88 package p5-1219 1991 microprocessor data book

PLCC20K      L2    AMP PLCC socket for PLCC20 part # 821815-1

PLCC28K      L2    AMP PLCC socket for PLCC28 part # 821581-1

PLCC32K      L2    AMP PLCC socket for PLCC32 part # 821665-1

PLCC44K      L2    TI socket for PLCC44 part page 5-30 1988 CMOS book

PLCC52K      L1    TI socket for PLCC52 part page 5-30 1988 CMOS book

PLCC68K      L2    TI sockect for PLCC68 part page 5-30 1988 CMOS book

PLCC84K      L2    TI sockect for PLCC84 part page 5-30 1988 CMOS book

RRDIP8       L2    8-pin DIP used with resistor network

SDIP16       L1    Shrink DIP16 package (70 mil) p67 Digikey Mar. 94

SDIP28       L1    Shrink DIP28 package (70 mil) p 67 Digikey Mar. 94

SDIP28-4     L2    Shrink DIP28 package, 400 mil (70 mil) p67 Digikey  Mar 94

SDIP30-4     L2    Shrink DIP30 package, 400 mil (70 mil) p67 Digikey  Mar 94

SDIP40       L1    600 mil shrink DIP40 package (70 mil) p67 Digikey Mar. 94

SDIP42       L2    shrink DIP42 part (70 mil) p67 Digikey Mar. 94

SDIP48       L2    Shrink DIP48 part (70mil) p67 Digikey Mar. 94

SDIP48-4     L2    400 mil shrink DIP48 part (70 mil) p67 Digikey Mar. 94

SDIP64       L2    Shrink DIP64 (70 mil) p 67 Digikey Mar 94

SIMM30       L2    SIMM socket from AMP catalog 82750 6/91 pg10034

SIMM40       L2    SIMM40 socket from AMP catalog 82750 6/91 pg 10032

SIMM64       L2    SIMM64 socket from Amp catalog 82750 6/91 pg 10032

SIMM68       L2    SIMM68 socket from AMP catalog 82750 6/91 pg 10032

SIMM72       L2    SIMM72 socket from AMP catalog 82750 6/91 pg 10032

SIMM80       L2    SIMM80 socket from Amp catalog 82750 6/91 pg 10032

SIP38-14      L2    38-14 Lead Plastic SIP from BURR-BROWN IC Databook 95 pgd.19

ZIP20        L1    NEC 20-pin ZIP package, p 12-10 1991 memory products

ZIP24        L1    NEC 24-pin ZIP package p12-18 1991 memory products

ZIP28        L1    NEC 28-pin ZIP package, p12-24 1991 memory products

ZIP40        L2    NEC 40-pin zip package, 1993 memory products data book

ZIP56        L2    EDI package 160/161 p453 SRAM data book

ZIP60        L2    EDI package 158 p454 SRAM data book

ZIP64        L2    EDI package 87 p445 SRAM data book

ZIP80        L2    EDI package 158 p454 SRAM data book EDI package 164


Inductors (Through-Hole)

COILCT       L1    Center-tapped coil package

IND300       L2    Inductor with 300 mil spacing

IND400       L2    Inductor with 400 mil spacing

INDUCT       L1    Inductor package


Miscellaneous (Through-Hole)

ANT          L1    Antenna connection point

BATTERY      L1    battery connection points

BCD12B       L2    Digit Led Display from DATEL Databook 96 pg 1-26

BRIDGE1      L2    VARO 1 AMP Bridge, p. 13 1982 catalog

BUZZER       L1    Buzzer package

CIGPLUG      L2    cigarette plug

CTS75S6      L2    National Semiconductor P11A package Linear Manual 1982. p 14-29

DMS10A       L2    3.5 Digit,LCD Display Panel Voltmeter from DATEL Databook 96 pg 1-27

DMS12A       L2    3.5 Digit Led Display from DATEL Databook 96 pg 1-3

DMS12B       L2    Digit Led Display from DATEL Databook 96 pg 1-26

DSD24A       L2    Digit Led Display from DATEL Databook 96 pg 2-18

ELSA35       L2    Digi-Key Catalog No. 956 12/95,Pg 183 EMI Bead Core from Panasonic

FUSE1        L1    Microfuse p. 300 Digi-Key Fall 94

FUSE2        L2    TR5 Digi-Key Catalog 963 1996 pg 374

FUSE4        L2    .4 Fuse Digi-Key Catalog 963 1996 pg 375

HEADPHN      L1    Headphone connection point

LAMP         L1    Incandescent lamp

LED_T1       L1    LED package

LED1         L2    LED from Digi-Key Catalog 963 1996 pg 398

LED2         L2    LED from Digi-Key Catalog 963 1996 pg 398

LED3         L2    LED from Digi-Key Catalog 963 1996 pg 398

LED4         L2    LED from Digi-Key Catalog 963 1996 pg 398

LED5X2       L2    Dual LED from Digi-Key Catalog 963 pg 398

LED6X2       L2    LED from Digi-Key Catalog 963 1996 pg 398

LED7X4       L2    Quad LED from Digi-Key Catalog 963 1996 pg 398

LED8         L2    LED from Digi-Key Catalog 963 1996 pg 398

METER        L2    Ammeter/voltmeter connection point (M designator)

METERA       L2    Ammeter/voltmeter connection point with A designator

MHV15        L2    Unitrode 15-pin horizontal multiwatt from 1990 linear data book

MIKE         L1    Microphone connection point

MOTOR        L2    Connection for motor with grounded case

MV15         L2    Unitrode 15-pin vertical multiwatt from 1990 linear data book

P11A         L2    National Semiconductor P11A package Linear Manual 1982. p 14-29

PJACK        L1    Switchcraft right angle 2-conductor jack MDPC2ARA

PJACK3       L1    Switchcraft right angle 3-conductor jack SN37 series

PLUG         L1    AC 2-prong plug connection point

PLUG_GND     L1    AC 3-prong plug connection point

SIP11        L2    National Semiconductor P11A package Linear Manual 1982. p 14-29

SPKR         L1    Speaker contact package (K designator)

SPKR1        L1    Speaker contact package (SPKR designator)

TRANSCT      L1    Center-tapped transformer

TRANS4       L1    Transformer

TRANS5       L2    Center-tapped transformer

XPART        L1    DEFAULT package (used by placement utility only)


Potentiometers (Through-Hole)

B3292W       L1    Bourns 3292 3/8" multiturn potentiometer with top adjustment

POT0FA       L2    Panasonic 3/8"  single turn potentiometer

POT1FA       L2    Panasonic 3/8"  single turn potentiometer

POTMAG       L2    Panasonic 5mm square  single turn potentiometer

POTMBG       L2    Panasonic 5mm square  single turn potentiometer

R15TRN       L1    Panasonic 13 turn 3/4" cermet potentiometer


Relays (Through-Hole)

R_DSP1       L1    Hamlin reed relay packagr HE-106 thru HE-111

R_SPD2       L1    Hamlin reed relay packagr HE-112 thru HE-117

R_SPS1       L1    Hamlin reed relay packagr HE-100 thru HE-105

RYDPDT       L2    Omron DPDT relay G5V-2-H-DC5


Resistors

CTSIP10      L2    CTS 750/770 series resistor network

CTSIP6       L2    CTS 750/770 series resistor network

CTSIP8       L2    CTS 750/770 series resistor network

RAXL0P3      L1    Axial resistor with .3" spacing

RAXL0P4      L1    Axial resistor with .4" spacing

RAXL0P5      L1    Axial resistor with .5" spacing

RAXL0P6      L1    Axial resistor with .6" spacing

RAXL0P7      L1    Axial resistor with .7" spacing

RAXL0P8      L1    Axial resistor with .8" spacing

RAXL0P9      L1    Axial resistor with .9" spacing

RAXL1P0      L1    Axial resistor with 1.0" spacing

RES4W        L1    1/4 watt  resistor package, 500 mil hole spacing

SIP10        L2    Resistor SIP package

SIP12        L2    Resistor SIP package (Bourns)

SIP13        L2    Resistor SIP package (Bourns)

SIP14        L2    Resistor SIP package (Bourns)

SIP3         L2    resistor SIP package (Bourns)

SIP4         L2    Resistor SIP package (Bourns)

SIP5         L2    Resistor SIP package (Bourns)

SIP6         L2    Resistor SIP package (Bourns)

SIP7         L2    Resistor SIP package (Bourns)

SIP8         L2    Resistor SIP package (Bourns)

SIP9         L2    Signetics SOT-110B package


Switches (Through-Hole)

7101C        L2    C&K SPDT switch, vertical

7102C        L2    C&K DPDT switch, vertical

BCD          L1    BCD switch similar to OMRON SW214 Digi-Key p235 Mar.94

BD01         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD02         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD02AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD03         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD03AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD04         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD04AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD05         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD05AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD06         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD06AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD07         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD07AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD08         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD08AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD09         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD09AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD10         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD10AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD12         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD12AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

CK3M1        L2    C&K Catalog 9105 pg F-5 Minithumbwheel Switch

CKDPDT1      L2    Slide Switch C&K Catalog 9105 pg E-13

CKP5DP10     L2    from C&K M Series Catalog 9105,pg G-5 Half-Inch Rotary Switch

CKP5DP12     L2    Half-Inch Rotary Switch from C&K Catalog 9105,pg G-5

CKP5SP10     L2    Half-Inch Rotary Switch from C&K M Series Catalog 9105,pg G-5

CKP5SP12     L2    Half-Inch Rotary Switch from C&K Catalog 9105,pg G-5

CKSPDT1      L2    Slide Switch from C&K Catalog 9105 pg E-5

CKSPDT2      L2    Slide Swith with A Terminals from C&K Catalog 9105, pgE-5

CKSPDT3      L2    Slide Switch from C&K Catalog 9105 pgE-8

CKSPDT4      L2    Slide Switch C&K Catalog 9105 pg E-13

CKSPST1      L2    Slide Switch from C&K Catalog 9105 pg E-5

CKSPST2      L2    from C&K Catalog 9105, pgE-5 Slide Swith with A Terminals

DPDT         L2    tie point for DPDT switch

DPST         L2    tie point for DPST switch

PB           L1    Push button

RDIP10       L2    CTS right-angle DIP switch 206-5RAST

RDIP12       L2    CTS right-angle DIP switch 206-6RAST

RDIP14       L2    CTS right-angle DIP switch 206-7RAST (.170" x .1" spacing)

RDIP16       L2    CTS right-angle DIP switch 206-8RAST (.170" x .1" spacing)

RDIP18       L2    CTS right-angle DIP switch 206-9RAST (.170" x .1" spacing)

RDIP20       L2    CTS right-angle DIP switch 206-9RAST (.170" x .1" spacing)

RDIP24       L2    CTS right-angle DIP switch 206-9RAST (.170" x .1" spacing)

RDIP4        L2    CTS right-angle DIP switch 206-2RAST

RDIP6        L2    CTS right-angle DIP switch 206-3RAST

RDIP8        L2    CTS right-angle DIP switch 206-5RAST

ROT10SW      L2    10-position rotary switch connection point

ROT9SW       L2    9-position rotary switch connection point

SPD2         L1    Single-pole/double throw switch

SPD3         L1    Connection point for SPD3 switch

SPD4         L1    Single-pole/4-position switch

SW5K         L2    connection point for dual 5 psn/4-pole switch

SWIT         L2    Push-button contacts

SWK2         L2    header for dual double throw switch


Transistors & TOXXX Packages (Through-Hole)

TO100        L2    10 Pin TO-100 from GE Solid State,Volume 2 1988 pg2-524

TO100M       L2    TO-100M from BURR-BROWN Volume 33 pg3-13

TO18         L2    TO18 package National Semi Transistor manual 1982, p12-15

TO202        L2    TO202 package National Semi Transistor manual 1982, p12-18

TO202A       L2    3 Lead TO-202,NS Package Number P03A from National Data,1995 pg.10-51

TO204AA      L2    JEDEC TO-204AA,from GE Solid State,1988 vol 2 pg 3-15

TO204AE      L2    JEDEC TO-204AE,from GE Solid State,1988 VOl 2 pg 3-15

TO220        L1    TO220 package National Semi Transistor manual 1982, p12-18

TO220-5      L2    TO220,5-Lead from BURR-BROWN IC Databook pgd.17

TO220-5A     L2    TO220-5A package,Linear Tech.,1994 pg 14-27

TO220-5B     L2    TO220-5b package from Linear Tech. 1994 pg 14-27

TO220-7A     L2    TO220-7a package, from Linear Tech. 1994, pg14-29

TO220A5      L2    5-lead TO220 package for LT1005 (Linear Technology)

TO220D       L2    TO220 SCR package

TO220H       L2    TO220 package with H designator

TO220T       L2    TO220 TRIAC package

TO220V       L2    TO220 voltage regulator package

TO226        L2    3 Lead Molded TO226 (NS# RC03A) from National Data, 95 pg.10-52

TO3          L2    TO3 package, Motorola p4-140 1979 Power Device Data

TO39         L2    TO-39 package, National Semi. Transistor manual 1982 p12-15

TO39H3       L2    3-Lead TO-39 Metal Can, H Package from Linear Tech., 1992 pg.14-8

TO39H4       L2    4-Lead TO-39 Metal Can, H Package from Linear Tech., 1992 pg.14-8

TO3J4        L2    4 Lead Metal Package TO3,from Linear Tech.,1990 Volume I pg4-28

TO3K2        L2    from Linear Tech., 1990 V 1 pg 4-15 TO-3 Metal Can, K Package

TO3M         L2    TO-3M from BURRBROWN Volume 33 pg2-111

TO3U         L2    TO3 package with U designator,National KO2A package

TO46         L2    TO-46 package, Linear technology 1990, Vol 1 p.3-30

TO46A        L2    2 Lead TO46 Metal Can Package from National Data, 95 pg.10-33

TO46D        L2    4Lead TO-46 Metal Can Package from National Data, 95 pg. 10-34

TO46H2       L2    2 Lead TO-46 Metal Can, H Package from Linear Tech.,1990 V 1 pg.3-24

TO46H3       L2    3 Lead TO-46 Metal Can, H Package from Linear Tech.,1990 V 1 pg.3-30

TO5          L2    TO5 package National Semi Transistor manual 1982, p12-15

TO5-10       L2    10-pin TO5 package

TO5-8        L2    8 Lead TO-5 Metal Can NS Package from National, 1995 pg.10-35

TO52H3       L2    3 Lead To-52 Metal Can H Package from Linear Tech., 1990 V 1 pg.3-124

TO5H10       L2    TO-5 Metal Can H Package from Linear Tech., 1990 Volume 1 pg 6-6

TO5H3        L2    3-Lead TO-5 Metal Can H Package from Linear Tech.,1990 V 1 pg.3-76

TO5H8        L2    8-Lead TO-5 H Package from Linear Tech., 1990 pg.3-40

TO5S8        L2    8 Lead TO-5 with DIL Formed Leads from GE Solid State,1988 V 2 pg 1-96

TO5T12       L2    12 Lead TO-5 Jedec Outline from GE Solid State, 1988 Volume 2 pg 1-98

TO5V10       L2    10 Lead TO-5 with Formed Leads Radially Arranged

TO5V12       L2    12 Lead TO-5 from GE Solid State, 1988 Volume 2 pg 1-98

TO5V8        L2    8 Lead TO-5 from GE Solid State, 1988 Volume 2 pg 1-96

TO66A2       L2    2 Lead TO-66,from GE Solid State,1988 Volume II pg3-16

TO71         L2    6 Lead TO-71 from GE Solid State, 1988 Volume 2 pg 2-522

TO72H4       L2    4 Lead TO-72 from GE Solid State,1988 Volume 2 pg 1-95

TO72US4      L2    TO-72 4 Lead (US) from GE Solid State, 1988 Volume II pg2-523

TO78TT6      L2    6 Lead TO-78 from GE Solid State, 1988 Volume 2 pg 2-523

TO8          L2    12 Lead TO-8 from BURR-BROWN Volume 33 pg2-178

TO92         L1    TO92 package National Semi Transistor manual 1982, p12-17

TO92Z3       L2    3 Lead TO-92 from Linear Tech.,Volume I 1990 pg3-86

TO99         L2    TO-99 from BURR-BROWN Volume 33 pg3-159

TO99TV       L2    8 Lead TO-99 (TV,TY) from GE Solid State, 1988 Volume 2 pg 2-523

TO99TZ       L2    8 Lead TO-99 (TZ) from GE Solid State, 1988 Volume 2 pg 2-523


Through-Hole Packages (Alphabetical)

156SIP10     L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1101)

156SIP11     L2    Molex/Waldom .045" SIP, .156 centers header (28-48-1111)

156SIP12     L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1121)

156SIP2      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1021)

156SIP3      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1031)

156SIP4      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1041)

156SIP5      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1051)

156SIP6      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1061)

156SIP7      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1071)

156SIP8      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1081)

156SIP9      L2    Molex/Waldom .045" SIP, .156 centers header (26-48-1091)

7101C        L2    C&K SPDT switch, vertical

7102C        L2    C&K DPDT switch, vertical

ANT          L1    antenna connection point

B3292W       L1    Bourns 3292 3/8" multiturn potentiometer with top adjustment

BATTERY      L1    battery connection points

BCD          L1    BCD switch similar to OMRON SW214 Digi-Key p235 Mar.94

BCD12B       L2    Digit Led Display from DATEL Databook 96 pg 1-26

BD01         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD02         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD02AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD03         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD03AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD04         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD04AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD05         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD05AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD06         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD06AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD07         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD07AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD08         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD08AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD09         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD09AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD10         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD10AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BD12         L2    Dip Switch from C&K Catalog 9105 91-92 pgE-3

BD12AV       L2    Dip Switch C&K catalog 1991-92 pg E-3

BRIDGE1      L1    Diode Bridge

BUZZER       L1    Buzzer package

C1E4P        L1    Panasonic V-series .01mf capacitor (.2" spacing)

C1E5P        L1    Panasonic V-series .1mf capacitor

C1E7M        L2    Capacitor with 0.35" spacing

C1M          L1    Panasonic V-series 1.0mf capacitor

C47E4P       L1    Panasonic V-series .47mf capacitor

CAP1         L2    Upright Capacitor, 100 mil spacing

CAP2         L2    Upright Capacitor, 200 mil spacing

CAP3         L2    Upright Capacitor, 300 mil spacing

CAXL0P3      L1    Axial capacitor with .3" spacing

CAXL0P4      L1    Axial capacitor with .4" spacing

CAXL0P5      L1    Axial capacitor with .5" spacing

CAXL0P6      L1    Axial capacitor with .6" spacing

CAXL0P7      L1    Axial capacitor with .7" spacing

CAXL0P8      L1    Axial capacitor with .8" spacing

CAXL0P9      L1    Axial capacitor with .9" spacing

CAXL1P0      L1    Axial capacitor with 1.0" spacing

CIGPLUG      L2    cigarette plug

CK3M1        L2    C&K Catalog 9105 pg F-5 Minithumbwheel Switch

CKDPDT1      L2    Slide Switch C&K Catalog 9105 pg E-13

CKP5DP10     L2    from C&K M Series Catalog 9105,pg G-5 Half-Inch Rotary Switch

CKP5DP12     L2    Half-Inch Rotary Switch from C&K Catalog 9105,pg G-5

CKP5SP10     L2    Half-Inch Rotary Switch from C&K M Series Catalog 9105,pg G-5

CKP5SP12     L2    Half-Inch Rotary Switch from C&K Catalog 9105,pg G-5

CKSPDT1      L2    Slide Switch from C&K Catalog 9105 pg E-5

CKSPDT2      L2    Slide Swith with A Terminals from C&K Catalog 9105, pgE-5

CKSPDT3      L2    Slide Switch from C&K Catalog 9105 pgE-8

CKSPDT4      L2    Slide Switch C&K Catalog 9105 pg E-13

CKSPST1      L2    Slide Switch from C&K Catalog 9105 pg E-5

CKSPST2      L2    from C&K Catalog 9105, pgE-5 Slide Swith with A Terminals

COILCT       L1    Center-tapped coil package

CONN96       L2    3 x  32 connector

CTS75S6      L2    National Semiconductor P11A package Linear Manual 1982. p 14-29

CTSIP10      L2    CTS 750/770 series resistor network

CTSIP6       L2    CTS 750/770 series resistor network

CTSIP8       L2    CTS 750/770 series resistor network

DB15         L1    15 pin right angle D connector Burndy catalog p.4-8 1990

DB25         L1    Burndy 25-pin right-angle D connector p4-8 1990 catalog

DB37         L1    Burndy 37-pin right-angle D connector p4-8 1990 catalog

DB9          L1    9 pin right angle connector Burndy catalog p4-8 1990

DIODE2       L2    Diode, 200mil spacing

DIODE2P5     L2    Diode, 250mil spacing

DIODE3       L2    Diode, 300mil spacing

DIODE4       L2    Diode, 400mil spacing

DIODE5       L2    Diode, 500mil spacing

DIODE6       L2    Diode, 600mil spacing

DIODE7       L2    Diode, 700mil spacing

DIP10        L2    National Semiconductor Linear Manuaal 1982 p. 14-25, N10B package

DIP10M       L2    Package for MAN3480 7-segment display (General Instrument)

DIP12        L2    DIP12 package

DIP14        L1    DIP14 package, N014 TI TTL data book 1988, p3-15

DIP14J       L2    DIP14 package for connector/header

DIP14MC      L2    Metal Can Package from BURR-BROWN Volume 33 pg2-154

DIP14R       L2    DIP14 with R designator

DIP14S       L2    DIP14 with S designator

DIP16        L1    DIP16 package, N016 TTL data book 1988, p3-16

DIP16-8      L2    Single Wide 16-Pin Dip from BURR-BROWN Volume 33 pg4-59

DIP16MC      L2    DIP16 Metal Dip from BURR-BROWN Volume 33 pg 2-139

DIP18        L2    DIP18 package

DIP18-6      L2    DIP18 package used for MAN6700 display

DIP18ISO     L2    DIP18ISO package,Linear Tech. 1994, pg 14-19

DIP18J       L2    DIP18 package for connector/header

DIP18MC      L2    Metal Hermetic DIP18 from BURR-BROWN Volume 33 pg3-37

DIP20        L1    TI DIP20 package N020 p 3-17 TTL data book 1988

DIP20-10     L2    20-Lead ISO Omni from BURR-BROWN IC Databook 95 pgD.5

DIP20CA      L2    16 Pin Dip20 T WIDE from BURR-BROWN Volume 33 pg4-97

DIP20CB      L2    19 Pin Dip20 T WIDE from BURR-BROWN Volume 33 pg4-111

DIP20MC      L2    20 Pin Dip Metal Can from BURR-BROWN Volume 33 pg4-97

DIP22        L2    400 mil DIP22 package J22A National Semi. CMOS data book 1984 p16-8

DIP22-3      L2    300 mil DIP22 package (IDT)

DIP24        L1    600 mil DIP24 package

DIP24-12     L2    DIP24-12 from BURR-BROWN Linear Databook 94 pgD.13

DIP24-16     L2    24-Pin Double-Wide Hermetic DIP from BURR-BROWN Volume 33 pg4-22

DIP24-3      L1    300 mil DIP24 package (IDT)

DIP24CA      L2    Dip24 with 15 pins from BURR-BROWN Volume 33 pg5-103

DIP24J       L2    DIP24 package for connector/header

DIP24MC      L2    Dip24 with 16 pins from BURR-BROWN Volume 33 pg5-103

DIP24N       L2    DIP24 Single Wide from BURR-BROWN IC Databook 95 pgD.15

DIP28        L1    DIP28 package N028 TI TTL data book, 1988 p3-18

DIP28-14     L2    DIP28-14 from BURR-BROWN IC Databook 95 pgD.18

DIP28-3      L2    300 mil DIP28 package (IDT)

DIP28-4      L2    400 mil DIP28 package (IDT)

DIP28N       L2    DIP28N from BURR-BROWN Linear Databook 94 pgD.14

DIP32        L2    NEC package, p12-29 Memory products 1991

DIP32-16     L2    32-Pin Triple Wide Dip from BURR-BROWN Volume 33 pg4-36

DIP32H       L2    package part for Analog Devices DAS1152 converter

DIP32MC      L2    DIP32 Metal Can from BURR-BROWN Volume 33 pg3-153

DIP4         L2    used for CTS 206-2 part & others (2 psn DIP switch)

DIP40        L1    600 mil DIP40 package N040 TI TTL databook 1988 p3-19

DIP40-16     L2    40-Pin Double Wide Hermetic Dip from BURR-BROWN Volume 33 pg4-22

DIP40MC      L2    Dip40 Metal Can from BURR-BROWN Volume 33 pg9.2-121

DIP42        L2    NEC DIP part, p7-8 microprocessor data book 1990

DIP46        L2    Dip-46 Metal Can from BURR-BROWN Volume 33 pg9.2-113

DIP46MC      L2    Dip-46 Metal Can from BURR-BROWN Volume 33 pg9.2-113

DIP48        L2    NEC DIP part, p7-11 microprocessor data book 1990

DIP48-4      L2    400 mil DIP48 part (IDT)

DIP4S        L2    DIP4 with S designator

DIP50-9      L2    Preci-DIP 50-pin socket

DIP6         L2    Used for CTS 206-3 part & others (3 psn DIP switch)

DIP64        L2    600 mil DIP64 package

DIP64-9      L2    NEC DIP64 package page 4.3-6 idt 1992 High-performance logic

DIP68        L2    idt DIP68 package p. 4.3-5 1992 data book high performance logic

DIP8         L1    DIP8 package P008 TI TTL data book 1988 p 3-22

DIP8A        L1    DIP8 package with A designator

DIP8IC       L1    DIP8 package with IC designator

DJ26         L2    Page 2-12 1989 TI MOS Memory

DMP14        L2    14-pin DIL plastic mini-mold from JRC C-MOS IC Databook pg 1-6

DMP16        L2    16-pin DIL plastic mini-mold from JRC C-MOS IC Databook pg 1-8

DMP20        L2    20-pin DIL plastic mini-mold from JRC C-MOS IC Databook,pg1-10

DMP24        L2    24-pin DIL plastic mini-mold from JRC C-MOS IC Databook pg 1-12

DMP30        L2    30-pin DIL plastic mini-mold from JRC C-MOS IC Databook pg1-14

DMP8         L2    8-pin DIL plastic minimold from JRC CMOS IC databook, pg 1-4

DMS10A       L2    3.5 Digit,LCD Display Panel Voltmeter from DATEL Databook 96 pg 1-27

DMS12A       L2    3.5 Digit Led Display from DATEL Databook 96 pg 1-3

DMS12B       L2    Digit Led Display from DATEL Databook 96 pg 1-26

DO7          L1    Diode, 200mil spacing

DPDT         L2    tie point for DPDT switch

DPST         L2    tie point for DPST switch

DSD24A       L2    Digit Led Display from DATEL Databook 96 pg 2-18

EACONN12     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN20     L1    EDAC series 337 connectors EDAC series 337 connectors

EACONN24     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN30     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN36     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN44     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN50     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN56     L2    EDAC series 337 connectors EDAC series 337 connectors

EACONN60     L2    EDAC series 337 connectors EDAC series 337 connectors

ECAP0P1      L1    Electrolytic capacitor with .1" centers

ECAP0P2      L1    Electrolytic capacitor with .2" centers

ECAP0P3      L1    Electrolytic capacitor with .3" centers

ECONN20      L1    TI H4 series connector .1" centers

ECONN26      L2    TI H4 series connector .1" centers

ECONN30      L2    TI H4 series connector .1" centers

ECONN34      L2    TI H4 series connector .1" centers

ECONN36      L2    TI H4 series connector .1" centers

ECONN44      L2    TI H4 series connector (.1" centers)

ECONN50      L2    TI H4 series connector (.1" centers)

ECONN56      L2    TI H4 series connector (.1" centers)

ECONN60      L2    TI H4 series connector (.1" centers)

ELSA35       L2    Digi-Key Catalog No. 956 12/95,Pg 183 EMI Bead Core from Panasonic

FCONN40      L2    TI H4 series connector .125" centers

FCONN62      L2    TI H4 series connector .125" centers

FCONN70      L2    TI H4 series connector .125" centers

FUSE1        L1    Microfuse p. 300 Digi-Key Fall 94

FUSE2        L2    TR5 Digi-Key Catalog 963 1996 pg 374

FUSE4        L2    .4 Fuse Digi-Key Catalog 963 1996 pg 375

G12B         L2    12 Lead Metal Can Package from National Semiconductor, 1989 pg 8-32

H1020        L2    Hirose rt angle DIN connector Digikey H1020

H1032        L2    Hirose rt angle DIN connector Digikey H1032

H1044        L2    Hirose rt angle DIN connector Digikey H1044

H1050        L2    Hirose rt angle DIN connector Digikey H1050

H1064        L2    Hirose rt angle DIN connector (plug) Digikey H1064

H1090        L2    Hirose rt angle DIN connector (plug) Digikey H1090

H10C         L2    10-lead package (TO100) National Semi. 1989 General Purpose Linear

H1100        L2    Hirose rt angle DIN connector (plug) Digikey H1100

HDR10        L2    Header with .025 posts (Sullins/3M)

HDR12        L2    12-pin DIP header (Sullins/3M)

HDR14        L2    14-pin DIP header (Sullins/3M)

HDR16        L2    16-pin DIP header (Sullins/3M)

HDR18        L2    18-pin DIP header (Sullins/3M)

HDR2         L2    2-pin DIP header (Sullins/3M)

HDR20        L2    20-pin DIP header (Sullins/3M)

HDR22        L1    22-pin header

HDR24        L2    24-pin DIP header (Sullins/3M)

HDR26        L2    26-pin DIP header (Sullins/3M)

HDR28        L2    28-pin DIP header (Sullins/3M)

HDR30        L2    30-pin DIP header (Sullins/3M)

HDR32        L2    32-pin DIP header (Sullins/3M)

HDR34        L2    34-pin DIP header (Sullins/3M)

HDR36        L2    36-pin DIP header (Sullins/3M)

HDR38        L2    38-pin DIP header (Sullins/3M)

HDR4         L2    4-pin DIP header (Sullins/3M)

HDR40        L2    40-pin DIP header (Sullins/3M)

HDR50        L2    50-pin DIP header (Sullins/3M)

HDR6         L2    6-pin DIP header (Sullins/3M)

HDR8         L2    8-pin DIP header (Sullins/3M)

HEADPHN      L1    Headphone connection point

HO8C         L2    8-pin package (TO99) National Semiconductor 1989 General Purpose Linear

IBM_AT       L2    2 x 18 aux edge card connector for IBM PC AT

IBM_XT       L1    2 x 31 edge card connector for IBM PC XT/AT

IND300       L2    Inductor with 300 mil spacing

IND400       L2    Inductor with 400 mil spacing

INDUCT       L1    Inductor package

J4           L2    15-pin rt angle connector

JACK1        L1    Switchcraft phono jack (3515PC), p2-26 1991 catalog

JSIP16       L2    16-pin strip connector

JSIP20       L2    20-pin strip connector

JSIP26       L2    26-pin strip connector

LAMP         L1    Incandescent lamp

LED_T1       L1    LED package

LED1         L2    LED from Digi-Key Catalog 963 1996 pg 398

LED2         L2    LED from Digi-Key Catalog 963 1996 pg 398

LED3         L2    LED from Digi-Key Catalog 963 1996 pg 398

LED4         L2    LED from Digi-Key Catalog 963 1996 pg 398

LED5X2       L2    Dual LED from Digi-Key Catalog 963 pg 398

LED6X2       L2    LED from Digi-Key Catalog 963 1996 pg 398

LED7X4       L2    Quad LED from Digi-Key Catalog 963 1996 pg 398

LED8         L2    LED from Digi-Key Catalog 963 1996 pg 398

METER        L2    Ammeter/voltmeter connection point (M designator)

METERA       L2    Ammeter/voltmeter connection point with A designator

MHV15        L2    Unitrode 15-pin horizontal multiwatt from 1990 linear data book

MIKE         L1    Microphone connection point

MOTOR        L2    Connection for motor with grounded case

MV15         L2    Unitrode 15-pin package from 1990 Unitrode Linear data book pg 7-16

OSC          L2    14-pin oscilltor package p77 Digikey Mar.1991

OSC14E       L2    Epson 14-pin osc. package (SG-51x) Digi-Key p. 79 Mar. 1991

OSC8         L2    8-pin oscilltor package p77 Digikey Mar.1991

OSC8E        L2    Epson 8-pin osc. package (SG-531x) Digi-Key p. 79 Mar. 1991

P11A         L2    National Semiconductor P11A package Linear Manual 1982. p 14-29

PB           L1    Push button

PGA132       L2    Intel Packaging 1991/1992 page 2-33

PGA144       L2    PGA144 package

PGA168       L2    Intel Packaging 1991/1992 page 2-34

PGA180       L2    PGA180 package for TI TMS320C30 chip page A-26, C30 User's Guide, 1988

PGA68        L1    IDT PGA68 package p4-3 1992 logic data book

PGA68-X      L2    alternate PGA68 package

PGA84        L2    PGA84 package

PGA88        L2    Intel PGA88 package p5-1219 1991 microprocessor data book

PJACK        L1    Switchcraft right angle 2-conductor jack MDPC2ARA

PJACK3       L1    Switchcraft right angle 3-conductor jack SN37 series

PLCC20K      L2    AMP PLCC socket for PLCC20 part # 821815-1

PLCC28K      L2    AMP PLCC socket for PLCC28 part # 821581-1

PLCC32K      L2    AMP PLCC socket for PLCC32 part # 821665-1

PLCC44K      L2    TI socket for PLCC44 part page 5-30 1988 CMOS book

PLCC52K      L1    TI socket for PLCC52 part page 5-30 1988 CMOS book

PLCC68K      L2    TI sockect for PLCC68 part page 5-30 1988 CMOS book

PLCC84K      L2    TI sockect for PLCC84 part page 5-30 1988 CMOS book

PLUG         L1    AC 2-prong plug connection point

PLUG_GND     L1    AC 3-prong plug connection point

POT0FA       L2    Panasonic 3/8"  single turn potentiometer

POT1FA       L2    Panasonic 3/8"  single turn potentiometer

POTMAG       L2    Panasonic 5mm square  single turn potentiometer

POTMBG       L2    Panasonic 5mm square  single turn potentiometer

R_DSP1       L1    Hamlin reed relay packagr HE-106 thru HE-111

R_SPD2       L1    Hamlin reed relay packagr HE-112 thru HE-117

R_SPS1       L1    Hamlin reed relay packagr HE-100 thru HE-105

R15TRN       L1    Panasonic 13 turn 3/4" cermet potentiometer

RAXL0P3      L1    Axial resistor with .3" spacing

RAXL0P4      L1    Axial resistor with .4" spacing

RAXL0P5      L1    Axial resistor with .5" spacing

RAXL0P6      L1    Axial resistor with .6" spacing

RAXL0P7      L1    Axial resistor with .7" spacing

RAXL0P8      L1    Axial resistor with .8" spacing

RAXL0P9      L1    Axial resistor with .9" spacing

RAXL1P0      L1    Axial resistor with 1.0" spacing

RCONN20      L1    5342 Molex connector p 21F 1982 Molex catalog

RCONN26      L2    5342 Molex connector p 21F 1982 Molex catalog

RCONN34      L2    5342 Molex connector p 21F 1982 Molex catalog

RCONN40      L2    5342 Molex connector p 21F 1982 Molex catalog

RCONN50      L2    5342 Molex connector p 21F 1982 Molex catalog

RCONN60      L2    5342 Molex connector p 21F 1982 Molex catalog

RDIP10       L2    CTS right-angle DIP switch 206-5RAST

RDIP12       L2    CTS right-angle DIP switch 206-6RAST

RDIP14       L2    CTS right-angle DIP switch 206-7RAST (.170" x .1" spacing)

RDIP16       L2    CTS right-angle DIP switch 206-8RAST (.170" x .1" spacing)

RDIP18       L2    CTS right-angle DIP switch 206-9RAST (.170" x .1" spacing)

RDIP20       L2    CTS right-angle DIP switch 206-9RAST (.170" x .1" spacing)

RDIP24       L2    CTS right-angle DIP switch 206-9RAST (.170" x .1" spacing)

RDIP4        L2    CTS right-angle DIP switch 206-2RAST

RDIP6        L2    CTS right-angle DIP switch 206-3RAST

RDIP8        L2    CTS right-angle DIP switch 206-5RAST

RES4W        L1    1/4 watt  resistor package, 500 mil hole spacing

ROT10SW      L2    10-position rotary switch connection point

ROT9SW       L2    9-position rotary switch connection point

RRDIP8       L2    8-pin DIP used with resistor network

RYDPDT       L2    Omron DPDT relay G5V-2-H-DC5

SDIP16       L1    Shrink DIP16 package (70 mil) p67 Digikey Mar. 94

SDIP28       L1    Shrink DIP28 package (70 mil) p 67 Digikey Mar. 94

SDIP28-4     L2    Shrink DIP28 package, 400 mil (70 mil) p67 Digikey  Mar 94

SDIP30-4     L2    Shrink DIP30 package, 400 mil (70 mil) p67 Digikey  Mar 94

SDIP40       L1    600 mil shrink DIP40 package (70 mil) p67 Digikey Mar. 94

SDIP42       L2    Shrink DIP42 part (70 mil) p67 Digikey Mar. 94

SDIP48       L2    Shrink DIP48 part (70mil) p67 Digikey Mar. 94

SDIP48-4     L2    400 mil shrink DIP48 part (70 mil) p67 Digikey Mar. 94

SDIP64       L2    Shrink DIP64 (70 mil) p 67 Digikey Mar 94

SIMM30       L2    SIMM socket from AMP catalog 82750 6/91 pg10034

SIMM40       L2    SIMM40 socket from AMP catalog 82750 6/91 pg 10032

SIMM64       L2    SIMM64 socket from Amp catalog 82750 6/91 pg 10032

SIMM68       L2    SIMM68 socket from AMP catalog 82750 6/91 pg 10032

SIMM72       L2    SIMM72 socket from AMP catalog 82750 6/91 pg 10032

SIMM80       L2    SIMM80 socket from Amp catalog 82750 6/91 pg 10032

SIP10        L2    Resistor SIP package

SIP11        L2    National Semiconductor P11A package Linear Manual 1982. p 14-29

SIP12        L2    Resistor SIP package (Bourns)

SIP13        L2    Resistor SIP package (Bourns)

SIP14        L2    Resistor SIP package (Bourns)

SIP3         L2    resistor SIP package (Bourns)

SIP38-14     L2    38-14 Lead Plastic SIP from BURR-BROWN IC Databook 95 pgd.19

SIP4         L2    Resistor SIP package (Bourns)

SIP5         L2    Resistor SIP package (Bourns)

SIP6         L2    Resistor SIP package (Bourns)

SIP7         L2    Resistor SIP package (Bourns)

SIP8         L2    Resistor SIP package (Bourns)

SIP9         L2    Signetics SOT-110B package

SPD2         L1    Single-pole/double throw switch

SPD3         L1    Connection point for SPD3 switch

SPD4         L1    Single-pole/4-position switch

SPKR         L1    Speaker contact package (k designator)

SPKR1        L1    Speaker contact package (spkr designator)

SW5K         L2    Connection point for dual 4-position switch

SWIT         L2    Push-button contacts

SWK2         L2    Connection point for dual double throw switch

TO100        L2    10 Pin TO-100 from GE Solid State,Volume 2 1988 pg2-524

TO100M       L2    TO-100M from BURR-BROWN Volume 33 pg3-13

TO18         L2    TO18 package National Semi Transistor manual 1982, p12-15

TO202        L2    TO202 package National Semi Transistor manual 1982, p12-18

TO202A       L2    3 Lead TO-202,NS Package Number P03A from National Data,1995 pg.10-51

TO204AA      L2    JEDEC TO-204AA,from GE Solid State,1988 vol 2 pg 3-15

TO204AE      L2    JEDEC TO-204AE,from GE Solid State,1988 VOl 2 pg 3-15

TO220        L1    TO220 package National Semi Transistor manual 1982, p12-18

TO220-5      L2    TO220,5-Lead from BURR-BROWN IC Databook pgd.17

TO220-5A     L2    TO220-5A package,Linear Tech.,1994 pg 14-27

TO220-5B     L2    TO220-5b package from Linear Tech. 1994 pg 14-27

TO220-7A     L2    TO220-7a package, from Linear Tech. 1994, pg14-29

TO220A5      L2    5-lead TO220 package for LT1005 (Linear Technology)

TO220D       L2    TO220 package with D designator

TO220H       L2    TO220 package with H designator

TO220T       L2    TO220 TRIAC package

TO220V       L2    TO220 voltage regulator package

TO226        L2    3 Lead Molded TO226 (NS# RC03A) from National Data, 95 pg.10-52

TO3          L2    TO3 package with U designator

TO3          L2    TO3 package, Motorola p4-140 1979 Power Device Data

TO39         L2    TO-39 package, National Semi. Transistor manual 1982 p12-15

TO39H3       L2    3-Lead TO-39 Metal Can, H Package from Linear Tech., 1992 pg.14-8

TO39H4       L2    4-Lead TO-39 Metal Can, H Package from Linear Tech., 1992 pg.14-8

TO3J4        L2    4 Lead Metal Package TO3,from Linear Tech.,1990 Volume I pg4-28

TO3K2        L2    from Linear Tech., 1990 V 1 pg 4-15 TO-3 Metal Can, K Package

TO3M         L2    TO-3M from BURRBROWN Volume 33 pg2-111

TO3U         L2    TO3 package,National KO2A package

TO46         L2    H Package Metal Can from Linear Tech.,1990 vol 1,pg 3-30

TO46         L2    TO-46 package, Linear technology 1990, Vol 1 p.3-30

TO46A        L2    2 Lead TO46 Metal Can Package from National Data, 95 pg.10-33

TO46D        L2    4Lead TO-46 Metal Can Package from National Data, 95 pg. 10-34

TO46H2       L2    2 Lead TO-46 Metal Can, H Package from Linear Tech.,1990 V 1 pg.3-24

TO46H3       L2    3 Lead TO-46 Metal Can, H Package from Linear Tech.,1990 V 1 pg.3-30

TO5          L2    TO5 package National Semi Transistor manual 1982, p12-15

TO5-10       L2    10-pin TO5 package

TO5-8        L2    8 Lead TO-5 Metal Can NS Package from National, 1995 pg.10-35

TO52H3       L2    3 Lead To-52 Metal Can H Package from Linear Tech., 1990 V 1 pg.3-124

TO5H10       L2    TO-5 Metal Can H Package from Linear Tech., 1990 Volume 1 pg 6-6

TO5H3        L2    3-Lead TO-5 Metal Can H Package from Linear Tech.,1990 V 1 pg.3-76

TO5H8        L2    8-Lead TO-5 H Package from Linear Tech., 1990 pg.3-40

TO5S8        L2    8 Lead TO-5 with DIL Formed Leads from GE Solid State,1988 V 2 pg 1-96

TO5T12       L2    12 Lead TO-5 Jedec Outline from GE Solid State, 1988 Volume 2 pg 1-98

TO5V10       L2    10 Lead TO-5 with Formed Leads Radially Arranged

TO5V12       L2    12 Lead TO-5 from GE Solid State, 1988 Volume 2 pg 1-98

TO5V8        L2    8 Lead TO-5 from GE Solid State, 1988 Volume 2 pg 1-96

TO66A2       L2    2 Lead TO-66,from GE Solid State,1988 Volume II pg3-16

TO71         L2    6 Lead TO-71 from GE Solid State, 1988 Volume 2 pg 2-522

TO72H4       L2    4 Lead TO-72 from GE Solid State,1988 Volume 2 pg 1-95

TO72US4      L2    TO-72 4 Lead (US) from GE Solid State, 1988 Volume II pg2-523

TO78TT6      L2    6 Lead TO-78 from GE Solid State, 1988 Volume 2 pg 2-523

TO8          L2    12 Lead TO-8 from BURR-BROWN Volume 33 pg2-178

TO92         L1    TO92 package National Semi Transistor manual 1982, p12-17

TO92Z3       L2    3 Lead TO-92 from Linear Tech.,Volume I 1990 pg3-86

TO99         L2    TO-99 from BURR-BROWN Volume 33 pg3-159

TO99TV       L2    8 Lead TO-99 (TV,TY) from GE Solid State, 1988 Volume 2 pg 2-523

TO99TZ       L2    8 Lead TO-99 (TZ) from GE Solid State, 1988 Volume 2 pg 2-523

TRANSCT      L1    Center-tapped transformer

TRANS4       L1    Transformer

TRANS5       L2    Center-tapped transformer

VARCAP1      L2    Sprague Goodman 10mm side adjust FILMTRIM(R) variable cap

VARCAP2      L2    Sprague Goodman 10mm top & bottom adjust FILMTRIM(R) variable cap

VARCAP3      L2    Sprague Goodman 8mm side adjust FILMTRIM(R) variable cap, p199 Digikey

VARCAP4      L2    Sprague Goodman 8mm top & bottom adjust FILMTRIM(R) variable cap

VOLTS        L2    tie point for transducer or signal source

WRSIP10      L2    Molex/Waldem PCB connector side entry (22-15-2106)

WRSIP11      L2    Molex/Waldem PCB connector side entry (22-15-2116)

WRSIP12      L2    Molex/Waldem PCB connector side entry (22-15-2126)

WRSIP2       L2    Molex/Waldem PCB connector side entry (22-15-2026)

WRSIP3       L2    Molex/Waldem PCB connector side entry (22-15-2036)

WRSIP4       L2    Molex/Waldem PCB connector side entry (22-15-2046)

WRSIP5       L2    Molex/Waldem PCB connector side entry (22-15-2056)

WRSIP6       L2    Molex/Waldem PCB connector side entry (22-15-2066)

WRSIP7       L2    Molex/Waldem PCB connector side entry (22-15-2076)

WRSIP8       L2    Molex/Waldem PCB connector side entry (22-15-2086)

WRSIP9       L2    Molex/Waldem PCB connector side entry (22-15-2096)

WSIP10       L1    Molex/Waldom .25" SIP header (22-03-2101)

WSIP11       L1    Molex/Waldom .25" SIP header (22-03-2111)

WSIP12       L1    Molex/Waldom .25" SIP header (22-03-2121)

WSIP2        L1    Molex/Waldom .25" SIP header (22-03-2021)

WSIP3        L1    Molex/Waldom .25" SIP header (22-03-2031)

WSIP4        L1    Molex/Waldom .25" SIP header (22-03-2041)

WSIP5        L1    Molex/Waldom .25" SIP header (22-03-2051)

WSIP6        L1    Molex/Waldom .25" SIP header (22-03-2061)

WSIP7        L1    Molex/Waldom .25" SIP header (22-03-2071)

WSIP8        L1    Molex/Waldom .25" SIP header (22-03-2081)

WSIP9        L1    Molex/Waldom .25" SIP header (22-03-2091)

WTSIP10      L2    Molex/Waldem PCB connector top entry (22-02-2105)

WTSIP11      L2    Molex/Waldem PCB connector top entry (22-02-2115)

WTSIP12      L2    Molex/Waldem PCB connector top entry (22-02-2125)

WTSIP2       L2    Molex/Waldem PCB connector top entry (22-02-2025)

WTSIP3       L2    Molex/Waldem PCB connector top entry (22-02-2035)

WTSIP4       L2    Molex/Waldem PCB connector top entry (22-02-2045)

WTSIP5       L2    Molex/Waldem PCB connector top entry (22-02-2055)

WTSIP6       L2    Molex/Waldem PCB connector top entry (22-02-2065)

WTSIP7       L2    Molex/Waldem PCB connector top entry (22-02-2075)

WTSIP8       L2    Molex/Waldem PCB connector top entry (22-02-2085)

WTSIP9       L2    Molex/Waldem PCB connector top entry (22-02-2095)

XPART        L1    DEFAULT package (used by placement utility only)

XTAL         L1    Crystal, 150 mil hole spacing

ZIP20        L1    NEC 20-pin ZIP package, p 12-10 1991 memory products

ZIP24        L1    NEC 24-pin ZIP package p12-18 1991 memory products

ZIP28        L1    NEC 28-pin ZIP package, p12-24 1991 memory products

ZIP40        L2    NEC 40-pin zip package, 1993 memory products data book

ZIP56        L2    EDI package 160/161 p453 SRAM data book

ZIP60        L2    EDI package 158 p454 SRAM data book

ZIP64        L2    EDI package 87 p445 SRAM data book

ZIP80        L2    EDI package 158 p454 SRAM data book EDI package 164


SURFACE
Surface-Mount Packages

Capacitors

Crystals & Oscillators (Surface Mount)

Diodes

ICs

Inductors

Miscellaneous

Resistors

Switches

Transistors

Alphabetical Listing


SURFACE (Alphabetical)
Surface-Mount Packages (Alphabetical)

C0805        L2    Surface mount cap

C1206        L1    Surface mount cap

C1210        L2    Surface mount cap

C1808        L2    Surface mount cap

C1812        L2    Surface mount cap

C2220        L2    Surface mount cap page 9-8 Signetics Linear Products vol. 1 1987

CKSPDT5      L2    Surface Mount Pushbutton Switch C&K GP Series,Catalog 9105 pg A-8

CKSPDT6      L2    from C&K GP Series,Catalog 9105 pg A-8 Suuface Mount Pushbutton Switch

CKSPDT7      L2    Surface Mount Pushbutton Switch from C&K GP Series,Catalog 9105 pg A-9

CKSPDT8      L2    Surface Mount Pushbutton Switch from C&K GP Series,Catalog 9105 pg A-9

CKSPDT9      L2    Surface Mount Pushbutton Switch from C&K GP Series,Catalog 9105

CKSPST5      L2    Surface Mount Pushbutton Switch C&K GP Series,Catalog 9105 pg A-8

CKSPST6      L2    from C&K GP Series,Catalog 9105 pg A-8 Surface Mount Pushbutton Switch

CKSPST9      L2    Surface Mount Pushbutton Switch from C&K GP Series,Catalog 9105

L1210        L1    Surface mount inductor

L1812        L1    Surface mount inductor

PLCC20       L1    PLCC20, pad specs in SIGNETICS Linear Manual Feb. 1987, Vol. 1, p. 9-7

PLCC28       L1    PLCC28, pad specs in SIGNETICS Linear Manual Feb. 1987, Vol. 1, p. 9-7

PLCC32       L1    PLCC32, pad specs in SIGNETICS Linear Manual Feb. 1987, Vol. 1, p. 9-7

PLCC44       L1    PLCC44, pad specs in SIGNETICS Linear Manual Feb. 1987, Vol. 1, p. 9-7

PLCC52       L1    PLCC52, pad specs in SIGNETICS Linear Manual Feb. 1987, Vol. 1, p. 9-7

PLCC68       L2    PLCC68, pad specs in SIGNETICS Linear  Manual Feb. 1987, Vol. 1, p. 9-7

PLCC84       L2    PLCC84, pad specs in SIGNETICS Linear Manual Feb. 1987, Vol. 1, p. 9-7

QFP100       L2    from OKI package databook, 1/93 pg 87 PLASTIC QFP100 (UNIT:mm)

QFP128       L2    PLASTIC QFP128 (UNIT:mm) from OKI Package Databook,1/93 pg 88

QFP136       L2    PLASTIC QFP136 (UNIT:mm) from OKI Package Catalog, 1/93 pg.88

QFP144       L2    from OKI Package Catalog, 1/93 pg.89 PLASTIC QFP144 (UNIT:mm)

QFP160       L2    PLASTIC QFP160 (UNIT:mm) from OKI Package Catalog,1/93 pg.89

QFP44        L2    PLASTIC QFP44 (UNIT:mm) from OKI Package Catalog, 1/93 pg.78

QFP52        L2    NEC QFP package p7-13 1990 16-bit V-series Microprocessor data book

QFP56        L2    PLASTIC QFP56 (UNIT:mm) from OKI Package Catalog,1/93 pg.80

QFP60        L2    PLASTIC QFP60 (UNIT:mm) from OKI Package Catalog, 1/93 pg.83

QFP64        L2    NEC QFP package p12-39 1991 memory data book

QFP74        L2    NEC QFP package p7-16 1990 16-bit V-series microprocessor data book

QFP80        L2    from OKI Package Databook, 1/93 pg 86 (UNIT: mm) PLASTIC QFP80

QFP88        L2    PLASTIC QFP88 from OKI Package Databook,1/93 pg 86 (UNIT:mm)

R0805        L1    Surface mount resistor

R1206        L1    Surface mount resistor

SM-OSC       L2    4-pin surface-mount package

SMFUSEA      L2    Surface Mount Fuse from Raychem,from Digi-Key Catalog 963 1996 pg375

SMFUSEB      L2    Surface Mount Fuse from Raychem,from Digi-Key Catalog 963 1996 pg375

SO14N        L1    14-pin small outline package, narrow (160 mil separation of pad rows)

SO14W        L1    14-pin small outline package, wide (325 mil separation of pad rows)

SO16N        L1    16-pin small outline package, narrow (160 mil separation of pad rows)

SO16W        L1    16-pin small outline package, wide (325 mil separation of pad rows)

SO18N        L2    18-pin small outline package, narrow (160 mil separation of pad rows)

SO20N        L2    16-pin small outline package, narrow (160 mil separation of pad rows)

SO20W        L1    Signetics linear manual vol. 1, p9-7

SO24N        L1    24-pin small outline package, narrow

SO24W        L1    Signetics linear manual vol. 1, p9-7

SO26-20      L2    26/20-pin SOJ (300 mil) from NEC 1993 memory products

SO26-24      L2    26/24-pin SOJ (350 mil) from NEC 1993 memory products

SO28-12      L2    SO28-12 from BURR-BROWN Linear Databook 94 pgD.10

SO28-24      L2    28/24-pin SOJ (400 mil) from NEC 1993 memory products

SO28-8       L2    SO28-8 from BURR-BROWN IC Databook 95 pgD.12

SO28N        L2    28-pin small outline package, narrow

SO28W        L1    Signetics linear manual vol. 1, p9-7

SO405        L2    Surface-Mount Crystal,from EPSON,Digi-Key Catalog 956 1995 pg155

SO40W        L2    40-pin SOJ (400 mil) from NEC 1993 memory products

SO42W        L2    42-pin SOJ from NEC 1993 memory products

SO505        L2    Surface-Mount Crystal,from EPSON from Digi-Key Catalog 956 1995 pg 155

SO8N         L2    Signetics 1989 Linear Data manual, p9-7 & p-36

SO8W         L2    Signetics Linear Manual Vol. 1, p9-7

SOD80W       L1    Surface mount diode

SOT223       L2    Surface mount transistor

SOT23        L2    Surface mount transistor

TQFP100      L2    100-Lead Thin Quad Flatpack, Silicon Systems

TQFP120      L2    120-Lead Thin Quad Flatpack, Silicon Systems

TQFP128      L2    128-Lead Thin Quad Flatpack, Silicon Systems

TQFP144      L2    144-Lead Thin Quad Flatpack, Silicon Systems

TQFP32       L2    132-Lead Thin Quad Flatpack, Silicon Systems

TQFP48       L2    48-Lead Thin Quad Flatpack, Silicon Systems

TQFP64       L2    64-Lead Thin Quad Flatpack, Silicon Systems

TQFP80       L2    80-Lead Thin Quad Flatpack, Silicon Systems

TSOP24-0     L2    24/20-pin TSOPI from NEC 1993 memory products

TSOP26-0     L2    26/20-pin TSOPII (300 mil) from NEC 1993 memory products

TSOP28-4     L2    28/24-pin TSOPII (400 mil) from NEC 1993 memory products

TSOP44       L2    44-pin TSOPII (400 mil) from NEC 1993 memory products

TSOP44-0     L2    44/40-pin TSOPII (300 mil) from NEC 1993 memory products

TSOP50       L2    50-pin TSOPII (400 mil) from NEC 1993 memory products

TSOP50-4     L2    50/44-pin TSOPII (400 mil) from NEC 1993 memory products


Capacitors (Surface Mount)

C0805        L2    Surface mount cap

C1206        L1    Surface mount cap

C1210        L2    Surface mount cap

C1808        L2    Surface mount cap

C1812        L2    Surface mount cap

C2220        L2    Surface mount cap page 9-8 Signetics Linear Products vol. 1 1987


Diodes (Surface Mount)

SOD80W       L1    Surface mount diode


Inductors (Surface Mount)

L1210        L1    Surface mount inductor

L1812        L1    Surface mount inductor


ICs (Surface Mount)

PLCC20       L1    PLCC20, pad specs in SIGNETICS Linear Manual Feb. 1987, Vol. 1, p. 9-7

PLCC28       L1    PLCC28, pad specs in SIGNETICS Linear Manual Feb. 1987, Vol. 1, p. 9-7

PLCC32       L1    PLCC32, pad specs in SIGNETICS Linear Manual Feb. 1987, Vol. 1, p. 9-7

PLCC44       L1    PLCC44, pad specs in SIGNETICS Linear Manual Feb. 1987, Vol. 1, p. 9-7

PLCC52       L1    PLCC52, pad specs in SIGNETICS Linear Manual Feb. 1987, Vol. 1, p. 9-7

PLCC68       L2    PLCC68, pad specs in SIGNETICS Linear  Manual Feb. 1987, Vol. 1, p. 9-7

PLCC84       L2    PLCC84, pad specs in SIGNETICS Linear Manual Feb. 1987, Vol. 1, p. 9-7

QFP100       L2    from OKI package databook, 1/93 pg 87 PLASTIC QFP100 (UNIT:mm)

QFP128       L2    PLASTIC QFP128 (UNIT:mm) from OKI Package Databook,1/93 pg 88

QFP136       L2    PLASTIC QFP136 (UNIT:mm) from OKI Package Catalog, 1/93 pg.88

QFP144       L2    from OKI Package Catalog, 1/93 pg.89 PLASTIC QFP144 (UNIT:mm)

QFP160       L2    PLASTIC QFP160 (UNIT:mm) from OKI Package Catalog,1/93 pg.89

QFP44        L2    PLASTIC QFP44 (UNIT:mm) from OKI Package Catalog, 1/93 pg.78

QFP52        L2    NEC QFP package p7-13 1990 16-bit V-series Microprocessor data book

QFP56        L2    PLASTIC QFP56 (UNIT:mm) from OKI Package Catalog,1/93 pg.80

QFP60        L2    PLASTIC QFP60 (UNIT:mm) from OKI Package Catalog, 1/93 pg.83

QFP64        L2    NEC QFP package p12-39 1991 memory data book

QFP74        L2    NEC QFP package p7-16 1990 16-bit V-series microprocessor data book

QFP80        L2    from OKI Package Databook, 1/93 pg 86 (UNIT: mm) PLASTIC QFP80

QFP88        L2    PLASTIC QFP88 from OKI Package Databook,1/93 pg 86 (UNIT:mm)

SO14N        L1    14-pin small outline package, narrow (160 mil separation of pad rows)

SO14W        L1    14-pin small outline package, wide (325 mil separation of pad rows)

SO16N        L1    16-pin small outline package, narrow (160 mil separation of pad rows)

SO16W        L1    16-pin small outline package, wide (325 mil separation of pad rows)

SO18N        L2    18-pin small outline package, narrow (160 mil separation of pad rows)

SO20N        L2    16-pin small outline package, narrow (160 mil separation of pad rows)

SO20W        L1    Signetics linear manual vol. 1, p9-7

SO24N        L1    24-pin small outline package, narrow

SO24W        L1    Signetics linear manual vol. 1, p9-7

SO26-20      L2    26/20-pin SOJ (300 mil) from NEC 1993 memory products

SO26-24      L2    26/24-pin SOJ (350 mil) from NEC 1993 memory products

SO28-12      L2    SO28-12 from BURR-BROWN Linear Databook 94 pgD.10

SO28-24      L2    28/24-pin SOJ (400 mil) from NEC 1993 memory products

SO28-8       L2    SO28-8 from BURR-BROWN IC Databook 95 pgD.12

SO28N        L2    28-pin small outline package, narrow

SO28W        L1    Signetics linear manual vol. 1, p9-7

SO40W        L2    40-pin SOJ (400 mil) from NEC 1993 memory products

SO42W        L2    42-pin SOJ from NEC 1993 memory products

SO8N         L2    Signetics 1989 Linear Data manual, p9-7 & p-36

SO8W         L2    Signetics Linear Manual Vol. 1, p9-7

TQFP100      L2    100-Lead Thin Quad Flatpack, Silicon Systems

TQFP120      L2    120-Lead Thin Quad Flatpack, Silicon Systems

TQFP128      L2    128-Lead Thin Quad Flatpack, Silicon Systems

TQFP144      L2    144-Lead Thin Quad Flatpack, Silicon Systems

TQFP32       L2    132-Lead Thin Quad Flatpack, Silicon Systems

TQFP48       L2    48-Lead Thin Quad Flatpack, Silicon Systems

TQFP64       L2    64-Lead Thin Quad Flatpack, Silicon Systems

TQFP80       L2    80-Lead Thin Quad Flatpack, Silicon Systems

TSOP24-0     L2    24/20-pin TSOPI from NEC 1993 memory products

TSOP26-0     L2    26/20-pin TSOPII (300 mil) from NEC 1993 memory products

TSOP28-4     L2    28/24-pin TSOPII (400 mil) from NEC 1993 memory products

TSOP44       L2    44-pin TSOPII (400 mil) from NEC 1993 memory products

TSOP44-0     L2    44/40-pin TSOPII (300 mil) from NEC 1993 memory products

TSOP50       L2    50-pin TSOPII (400 mil) from NEC 1993 memory products

TSOP50-4     L2    50/44-pin TSOPII (400 mil) from NEC 1993 memory products


Resistors (Surface Mount)

R0805        L1    Surface mount resistor

R1206        L1    Surface mount resistor


Transistors (Surface Mount)

SOT23        L1    Surface mount transistor

SOT223       L2    Surface mount transistor


Switches (Surface Mount)

CKSPDT5      L2    Surface Mount Pushbutton Switch C&K GP Series,Catalog 9105 pg A-8

CKSPDT6      L2    from C&K GP Series,Catalog 9105 pg A-8 Suuface Mount Pushbutton Switch

CKSPDT7      L2    Surface Mount Pushbutton Switch from C&K GP Series,Catalog 9105 pg A-9

CKSPDT8      L2    Surface Mount Pushbutton Switch from C&K GP Series,Catalog 9105 pg A-9

CKSPDT9      L2    Surface Mount Pushbutton Switch from C&K GP Series,Catalog 9105

CKSPST5      L2    Surface Mount Pushbutton Switch C&K GP Series,Catalog 9105 pg A-8

CKSPST6      L2    from C&K GP Series,Catalog 9105 pg A-8 Surface Mount Pushbutton Switch

CKSPST9      L2    Surface Mount Pushbutton Switch from C&K GP Series,Catalog 9105


Miscellaneous (Surface Mount)

SMFUSEA      L2    Surface Mount Fuse from Raychem,from Digi-Key Catalog 963 1996 pg375

SMFUSEB      L2    Surface Mount Fuse from Raychem,from Digi-Key Catalog 963 1996 pg375


Crystals & Oscillators (Surface Mount)

SO405        L2    Surface-Mount Crystal,from EPSON,Digi-Key Catalog 956 1995 pg155

SO505        L2    Surface-Mount Crystal,from EPSON from Digi-Key Catalog 956 1995 pg 155

SM-OSC       L2    4-pin surface-mount package